SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for xxl_job_group
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_group`;
CREATE TABLE `xxl_job_group`  (
                                `id` int(11) NOT NULL AUTO_INCREMENT,
                                `app_name` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '执行器AppName',
                                `title` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '执行器名称',
                                `address_type` tinyint(4) NOT NULL DEFAULT 0 COMMENT '执行器地址类型：0=自动注册、1=手动录入',
                                `address_list` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '执行器地址列表，多地址逗号分隔',
                                `update_time` datetime NULL DEFAULT NULL,
                                PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_group
-- ----------------------------
INSERT INTO `xxl_job_group` VALUES (1, 'xxl-job-executor', '示例执行器', 0, 'http://192.168.0.104:9101/', '2025-02-10 14:50:32');

-- ----------------------------
-- Table structure for xxl_job_info
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_info`;
CREATE TABLE `xxl_job_info`  (
                               `id` int(11) NOT NULL AUTO_INCREMENT,
                               `job_group` int(11) NOT NULL COMMENT '执行器主键ID',
                               `job_desc` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
                               `add_time` datetime NULL DEFAULT NULL,
                               `update_time` datetime NULL DEFAULT NULL,
                               `author` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '作者',
                               `alarm_email` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '报警邮件',
                               `schedule_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT 'NONE' COMMENT '调度类型',
                               `schedule_conf` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '调度配置，值含义取决于调度类型',
                               `misfire_strategy` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT 'DO_NOTHING' COMMENT '调度过期策略',
                               `executor_route_strategy` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器路由策略',
                               `executor_handler` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器任务handler',
                               `executor_param` varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器任务参数',
                               `executor_block_strategy` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '阻塞处理策略',
                               `executor_timeout` int(11) NOT NULL DEFAULT 0 COMMENT '任务执行超时时间，单位秒',
                               `executor_fail_retry_count` int(11) NOT NULL DEFAULT 0 COMMENT '失败重试次数',
                               `glue_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'GLUE类型',
                               `glue_source` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT 'GLUE源代码',
                               `glue_remark` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT 'GLUE备注',
                               `glue_updatetime` datetime NULL DEFAULT NULL COMMENT 'GLUE更新时间',
                               `child_jobid` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '子任务ID，多个逗号分隔',
                               `trigger_status` tinyint(4) NOT NULL DEFAULT 0 COMMENT '调度状态：0-停止，1-运行',
                               `trigger_last_time` bigint(13) NOT NULL DEFAULT 0 COMMENT '上次调度时间',
                               `trigger_next_time` bigint(13) NOT NULL DEFAULT 0 COMMENT '下次调度时间',
                               PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 9 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_info
-- ----------------------------
INSERT INTO `xxl_job_info` VALUES (1, 1, '自动巡检(日)', '2023-05-22 10:36:29', '2023-09-18 10:48:52', 'XXL', '', 'CRON', '0 0 0 1/1 * ?', 'DO_NOTHING', 'FIRST', 'inspectionDayHandler', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-05-22 10:36:29', '', 1, 1736524800000, 1739203200000);
INSERT INTO `xxl_job_info` VALUES (2, 1, '自动巡检(周)', '2023-05-22 10:38:46', '2023-09-18 10:48:49', 'XXL', '', 'CRON', '0 0 0 1/1 * ?', 'DO_NOTHING', 'FIRST', 'inspectionWeekHandler', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-05-22 10:38:46', '', 1, 1736524800000, 1739203200000);
INSERT INTO `xxl_job_info` VALUES (3, 1, '自动巡检(月)', '2023-05-22 10:43:20', '2023-09-18 10:48:46', 'XXL', '', 'CRON', '0 0 0 1/1 * ?', 'DO_NOTHING', 'FIRST', 'inspectionMonthHandler', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-05-22 10:43:20', '', 1, 1736524800000, 1739203200000);
INSERT INTO `xxl_job_info` VALUES (4, 1, '统计电能耗', '2023-08-25 10:54:12', '2023-08-25 10:56:06', 'XXL', '', 'FIX_RATE', '600', 'DO_NOTHING', 'FIRST', 'statisticsElectricityEnergy', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-08-25 10:54:12', '', 1, 1736504285188, 1739170746049);
INSERT INTO `xxl_job_info` VALUES (5, 1, '统计水能耗', '2023-08-25 13:45:40', '2023-08-25 13:46:34', 'XXL', '', 'FIX_RATE', '600', 'DO_NOTHING', 'FIRST', 'statisticsWaterEnergy', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-08-25 13:45:40', '', 1, 1736504285188, 1739170746049);
INSERT INTO `xxl_job_info` VALUES (6, 1, '统计电功率峰谷值平均值', '2023-09-08 14:15:55', '2023-10-18 10:49:54', 'XXL', '', 'FIX_RATE', '600', 'DO_NOTHING', 'FIRST', 'statisticsPower', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-09-08 14:15:55', '', 1, 1736504285188, 1739170746049);
INSERT INTO `xxl_job_info` VALUES (7, 1, '统计电流峰谷值平均值', '2023-10-18 10:49:40', '2023-10-18 10:51:18', 'XXL', '', 'FIX_RATE', '600', 'DO_NOTHING', 'FIRST', 'statisticsCurrent', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-10-18 10:49:40', '', 1, 1736504285188, 1739170746049);
INSERT INTO `xxl_job_info` VALUES (8, 1, '统计电压峰谷值平均值', '2023-10-18 10:50:54', '2023-10-18 10:51:15', 'XXL', '', 'FIX_RATE', '600', 'DO_NOTHING', 'FIRST', 'statisticsVoltage', '', 'SERIAL_EXECUTION', 0, 0, 'BEAN', '', 'GLUE代码初始化', '2023-10-18 10:50:54', '', 1, 1736504285188, 1739170746049);

-- ----------------------------
-- Table structure for xxl_job_lock
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_lock`;
CREATE TABLE `xxl_job_lock`  (
                               `lock_name` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '锁名称',
                               PRIMARY KEY (`lock_name`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_lock
-- ----------------------------
INSERT INTO `xxl_job_lock` VALUES ('schedule_lock');

-- ----------------------------
-- Table structure for xxl_job_log
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_log`;
CREATE TABLE `xxl_job_log`  (
                              `id` bigint(20) NOT NULL AUTO_INCREMENT,
                              `job_group` int(11) NOT NULL COMMENT '执行器主键ID',
                              `job_id` int(11) NOT NULL COMMENT '任务，主键ID',
                              `executor_address` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器地址，本次执行的地址',
                              `executor_handler` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器任务handler',
                              `executor_param` varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器任务参数',
                              `executor_sharding_param` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '执行器任务分片参数，格式如 1/2',
                              `executor_fail_retry_count` int(11) NOT NULL DEFAULT 0 COMMENT '失败重试次数',
                              `trigger_time` datetime NULL DEFAULT NULL COMMENT '调度-时间',
                              `trigger_code` int(11) NOT NULL COMMENT '调度-结果',
                              `trigger_msg` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '调度-日志',
                              `handle_time` datetime NULL DEFAULT NULL COMMENT '执行-时间',
                              `handle_code` int(11) NOT NULL COMMENT '执行-状态',
                              `handle_msg` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '执行-日志',
                              `alarm_status` tinyint(4) NOT NULL DEFAULT 0 COMMENT '告警状态：0-默认、1-无需告警、2-告警成功、3-告警失败',
                              PRIMARY KEY (`id`) USING BTREE,
                              INDEX `I_trigger_time`(`trigger_time`) USING BTREE,
                              INDEX `I_handle_code`(`handle_code`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 66 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_log
-- ----------------------------
INSERT INTO `xxl_job_log` VALUES (65, 1, 8, 'http://192.168.0.104:9101/', 'statisticsVoltage', '', NULL, 0, '2025-02-10 14:50:30', 200, '任务触发类型：手动触发<br>调度机器：192.168.0.104<br>执行器-注册方式：自动注册<br>执行器-地址列表：[http://192.168.0.104:9101/]<br>路由策略：第一个<br>阻塞处理策略：单机串行<br>任务超时时间：0<br>失败重试次数：0<br><br><span style=\"color:#00c0ef;\" > >>>>>>>>>>>触发调度<<<<<<<<<<< </span><br>触发调度：<br>address：http://192.168.0.104:9101/<br>code：200<br>msg：null', '2025-02-10 14:50:30', 200, '', 0);

-- ----------------------------
-- Table structure for xxl_job_log_report
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_log_report`;
CREATE TABLE `xxl_job_log_report`  (
                                     `id` int(11) NOT NULL AUTO_INCREMENT,
                                     `trigger_day` datetime NULL DEFAULT NULL COMMENT '调度-时间',
                                     `running_count` int(11) NOT NULL DEFAULT 0 COMMENT '运行中-日志数量',
                                     `suc_count` int(11) NOT NULL DEFAULT 0 COMMENT '执行成功-日志数量',
                                     `fail_count` int(11) NOT NULL DEFAULT 0 COMMENT '执行失败-日志数量',
                                     `update_time` datetime NULL DEFAULT NULL,
                                     PRIMARY KEY (`id`) USING BTREE,
                                     UNIQUE INDEX `i_trigger_day`(`trigger_day`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 10 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_log_report
-- ----------------------------
INSERT INTO `xxl_job_log_report` VALUES (1, '2025-01-06 00:00:00', 0, 32, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (2, '2025-01-05 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (3, '2025-01-04 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (4, '2025-01-10 00:00:00', 0, 32, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (5, '2025-01-09 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (6, '2025-01-08 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (7, '2025-02-10 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (8, '2025-02-09 00:00:00', 0, 0, 0, NULL);
INSERT INTO `xxl_job_log_report` VALUES (9, '2025-02-08 00:00:00', 0, 0, 0, NULL);

-- ----------------------------
-- Table structure for xxl_job_logglue
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_logglue`;
CREATE TABLE `xxl_job_logglue`  (
                                  `id` int(11) NOT NULL AUTO_INCREMENT,
                                  `job_id` int(11) NOT NULL COMMENT '任务，主键ID',
                                  `glue_type` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT 'GLUE类型',
                                  `glue_source` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT 'GLUE源代码',
                                  `glue_remark` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'GLUE备注',
                                  `add_time` datetime NULL DEFAULT NULL,
                                  `update_time` datetime NULL DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_logglue
-- ----------------------------

-- ----------------------------
-- Table structure for xxl_job_registry
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_registry`;
CREATE TABLE `xxl_job_registry`  (
                                   `id` int(11) NOT NULL AUTO_INCREMENT,
                                   `registry_group` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
                                   `registry_key` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
                                   `registry_value` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
                                   `update_time` datetime NULL DEFAULT NULL,
                                   PRIMARY KEY (`id`) USING BTREE,
                                   INDEX `i_g_k_v`(`registry_group`, `registry_key`, `registry_value`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 4 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_registry
-- ----------------------------
INSERT INTO `xxl_job_registry` VALUES (3, 'EXECUTOR', 'xxl-job-executor', 'http://192.168.0.104:9101/', '2025-02-10 14:50:22');

-- ----------------------------
-- Table structure for xxl_job_user
-- ----------------------------
DROP TABLE IF EXISTS `xxl_job_user`;
CREATE TABLE `xxl_job_user`  (
                               `id` int(11) NOT NULL AUTO_INCREMENT,
                               `username` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '账号',
                               `password` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '密码',
                               `role` tinyint(4) NOT NULL COMMENT '角色：0-普通用户、1-管理员',
                               `permission` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '权限：执行器ID列表，多个逗号分割',
                               PRIMARY KEY (`id`) USING BTREE,
                               UNIQUE INDEX `i_username`(`username`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of xxl_job_user
-- ----------------------------
INSERT INTO `xxl_job_user` VALUES (1, 'admin', 'e10adc3949ba59abbe56e057f20f883e', 1, NULL);

SET FOREIGN_KEY_CHECKS = 1;
